; ===========================================================================
; resgauge.def -- module definition file for the Resource Gauge application.
; ===========================================================================


; module name
NAME		ResGauge

; version control or copyright string
DESCRIPTION	'Resource Gauge v1.0 -- (c) 1991, Richard Franklin Albury'

; required for all Windows applications
EXETYPE		WINDOWS

; generates an error message if the application is run without Windows
STUB		'WINSTUB.EXE'

; code can be moved in memory and discarded/reloaded
CODE		PRELOAD MOVEABLE DISCARDABLE

; data must be MULTIPLE if program can be invoked more than once
DATA		PRELOAD MOVEABLE SINGLE

; size in bytes of the application's local heap
HEAPSIZE	1024

; size in bytes of the application's stack
STACKSIZE	5120	   ; recommended minimum for Windows is 5120


; ===================
; end of resgauge.def
; ===================
