%
% Oops! section number field was too small for section numbers >99 in 11pt mode.
%
\def\l@subsection{\@dottedtocline{2}{1.5em}{2.8em}}
%
% ... and page number box is too small for "A-nn" too.
%
\def\@pnumwidth{2.1em}
\def\@tocrmarg{2.1em}
