          ************** HOTKEYS ***************                               
                                                                               
                                                                               
             F1  ------------- This help guide                                 
             F2  ------------- Set colours                                     
             F3  ------------- Pop-down menu's                                 
             F9  ------------- Quick Monitor                                   
            F10  ------------- EXIT                                            
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
 Help system,  Overview                                                        
 ----------------------                                                        
 To use this help system simply page up/down using the cursor keys. You can    
 quit from help at any time by pressing Esc. To quit from the program at any   
 time press F10.                                                               
                                                                               
 Startup Screen and Menus                                                      
 ------------------------                                                      
 Before you use the CellTRAK system certain settings must be made and the      
 list of target numbers entered. This is accomplished using the "Pull down"    
 menus. These are activated by holding down the "Alt" key and pressing the     
 highlighted letter of the menu you require. Once any menu is visible you can  
 switch between menus using the left and right cursor keys. Options on the     
 menu may be selected either by using the up/down cursor keys and pressing     
 enter or alternatively pressing the highlighted letter of the option required.
 To quit from any menu simply press Esc.                                       
                                                                               
                                                                               
 New Users Guide                                                               
 ---------------                                                               
 What follows is a simple guide to enable new users to operate the system      
 quickly. This demonstration will show how to monitor a mobile phone located   
 within the same cell (Transmission Area) as yourself. Once the cell in which  
 the phone located is known however, reception can be possible up to a range   
 of around 5-10 miles for a mobile or vehicle mounted CellTRAK system, or up   
 to a maximum of around 20 miles for fixed equipment with external antenna.    
                                                                               
 The first thing that must be done is to enter a target telephone number,      
 these numbers are referred to by the cellular system as MIN numbers (Mobile   
 Identity Numbers) and are slightly different to the usual telephone number.   
 To calculate the MIN for any given telephone number the first 3-5 digits of   
 the telephone number are replaced by a "System code". This is very simple     
 to calculate using the following chart :-                                     
                                                                               
                                                                               
                                                                               
           0836-XXXXXX (Vodafone, United Kingdom)  =  2340-XXXXXX              
           0831-XXXXXX (Vodafone, United Kingdom)  =  2344-XXXXXX              
           0860-XXXXXX (Cellnet,  United Kingdom)  =  2342-XXXXXX              
           0850-XXXXXX (Cellnet,  United Kingdom)  =  2346-XXXXXX              
           0088-XXXXXX (EireCell, Ireland)         =  2720-XXXXXX              
           0337-XXXXXX (S.I.P.,   Italy)           =  2222-XXXXXX              
                                                                               
           Where X means the number stays the same.                            
           For other country/system codes please call your supplier.           
                                                                               
 PLEASE NOTE:                                                                  
 In some organisations editing of the target "MIN List" may be prohibited.     
 This is indicated by a warning tone when the Edit function is selected. In    
 this case numbers may be supplied as external files that can be loaded        
 using the File Menu.                                                          
                                                                               
                                                                               
                                                                               
 To enter your target MIN number, hold down the ALT key and press E to bring   
 up the "Edit menu". Select "Edit MIN List" and enter the MIN numbers in the   
 box that pops up, using the cursor keys to move around. When done press the   
 Esc key. Up to 16 numbers may be monitored at once, but please note that only 
 one call may be monitored at any time and all targets should be located       
 within the same cell (Transmission area).                                     
                                                                               
 Having entered a Target number the next thing is to take note of the          
 channel number (frequency code) of the cell in which the phone is located.    
 This is easily accomplished by taking the CellTRAK system to within about half
 a mile of the target phone (the nearer the better) and selecting the "View    
 Paging Channels" option from the view menu. If moving this close isn't        
 suitable there are other options available including coverage maps or specially
 programmed phones that will display which cell is strongest in any area.      
                                                                               
                                                                               
                                                                               
                                                                               
 Using the "View Paging Channels" option take note of the strongest "Paging    
 Channel" for the system you require. Two groups of channels will be           
 displayed. Channels 0023-0043 are classed as system A, and channels 0323-     
 0343 as system B.                                                             
                                                                               
 These two groups of channels are used by various cellular companies around    
 the world to enable two systems to operate using the same or similar          
 equipment.                                                                    
              System A (0023-0023)  :  Vodafone,   United Kingdom              
                                       S.I.P.,     Italy                       
                                       Telefonica, Spain                       
              System B (0323-0343)  :  Cellnet,  United Kingdom                
                                                                               
 In some countries more than two cellular systems operate. To accommodate these
 the View Channel Group option can be used to view other paging or voice       
 channel groups.                                                               
                                                                               
                                                                               
 Having noted the strongest channel for the network to which your target       
 phone is connected, select the Options Menu. This will display three options  
 which may be toggled on or off. A tick next to the options signifies on.      
                                                                               
  Monitor Any Call      When ON CellTRAK will monitor all calls or activity    
                        on the network in addition to any numbers on the       
                        target "MIN List".                                     
                        When OFF Only calls to/from phones on the target       
                        list will be monitored.                                
                                                                               
  Monitor Call Audio    When OFF the system will just increment the counter    
                        next to the MIN number of the phone when the phone     
                        registers to the system or makes/receives a call.      
                        When ON the system will allow monitoring of calls      
                        to/from the phone and follow those calls as they       
                        are transferred from one channel(frequency) or cell    
                        to another. This option would usually be ON.           
                                                                               
                                                                               
                                                                               
  Auto Call Release     For un-attended monitoring of calls in one location    
                        this would normally be ON to enable the CellTRAK       
                        system to automatically disconnect at the end of all   
                        calls. When the CellTRAK system is attended it is      
                        recommended this is switched OFF to enable the user    
                        to follow a target without losing calls due to week    
                        signal strength or interference. (Calls will still     
                        terminate if "released" by the system at the end of    
                        a call.)                                               
                                                                               
 For this demonstration set :   Monitor Any Call    =  Off                     
                                Monitor Call Audio  =  On                      
                                Auto Call Release   =  Off                     
                                                                               
                                                                               
                                                                               
 You are now ready to select "Monitor" from the Monitor Menu. When selected    
 you will need to enter the "Paging Channel" that you obtained from the "View  
 Paging Channel" option or coverage maps etc. Type this in where prompted and  
 press enter. Please note that if channel number 0000 is entered or enter is   
 pressed on its own the system will not be able to monitor any call audio.     
                                                                               
 After entering the channel the number under Wrd should flash between 1 and    
 0 indicating data received from the network. After a few seconds the Area     
 Identity Number of the local mobile exchange (sometimes called Switch)        
 should appear underneath the AID heading and some activity may be viewed      
 scrolling in the network window.                                              
                                                                               
 THE SYSTEM IS NOW SET TO RECEIVE ANY CALLS TO OR FROM THE TARGET PHONES.      
                                                                               
                                                                               
 When running the following keys may be used:-                                 
                                                                               
                                                                               
           When no call is in progress.                                        
           ----------------------------                                        
           Esc - Quit Back to "Inactive" prompt.                               
            C  - Enter new paging channel                                      
            M  - Enter voice channel to monitor                                
            V  - Go back to the last voice channel and monitor.                
                                                                               
           When monitoring a call.                                             
           -----------------------                                             
           End - Quit call and return to Paging Channel                        
       UpArrow - Volume Up                                                     
     DownArrow - Volume Down                                                   
    Left/Right - Change active audio output                                    
                                                                               
                                                                               
 Below is a brief overview of the headings at the bottom of the screen:-       
                                                                               
                                                                               
                                                                               
                                                                               
 PgChan - User selected paging channel                                         
  Audio - Current audio routing.                                               
    Vol - Current audio volume 0-7 (0=Min 7=Max)                               
Product - Indicates the version of CellTRAK you are running                    
   Unit - Indicates the CellTRAK unit you have connected                       
    AID - Area Identity of the cell you are monitoring                         
 RegInc - Registration Increment, Used by the phone for periodic registration  
     MS - TACS Version support of the cell (00=TACS Release 3,  01=Release 4)  
    Wrd - Word Received Data Indicator (Constant 0=No data)                    
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
                                                                               
