SCAN.HLP



 ▀▀▀▀▀   ▀▀▀▀  ▀▀▀▀▀   ▀▀▀▀▀▀  ▀▀▀▀▀▀  ▀▀   ▀▀  ▀▀▀▀▀  ▀▀▀▀▀▀▀▀ ▀▀▀▀▀▀ ▀▀▀▀▀▀  
▀▀      ▀▀  ▀▀ ▀▀   ▀▀ ▀▀      ▀▀   ▀▀ ▀▀   ▀▀ ▀▀   ▀▀    ▀▀    ▀▀     ▀▀   ▀▀ 
▀▀      ▀▀  ▀▀ ▀▀   ▀▀ ▀▀      ▀▀   ▀▀ ▀▀   ▀▀  ▀▀        ▀▀    ▀▀     ▀▀   ▀▀ 
▀▀      ▀▀  ▀▀ ▀▀   ▀▀ ▀▀▀▀    ▀▀▀▀▀▀  ▀▀   ▀▀    ▀▀      ▀▀    ▀▀▀▀   ▀▀▀▀▀▀  
▀▀      ▀▀  ▀▀ ▀▀   ▀▀ ▀▀      ▀▀   ▀▀ ▀▀   ▀▀      ▀▀    ▀▀    ▀▀     ▀▀   ▀▀ 
▀▀      ▀▀  ▀▀ ▀▀   ▀▀ ▀▀      ▀▀   ▀▀ ▀▀   ▀▀ ▀▀   ▀▀    ▀▀    ▀▀     ▀▀   ▀▀ 
 ▀▀▀▀▀   ▀▀▀▀  ▀▀▀▀▀   ▀▀▀▀▀▀  ▀▀▀▀▀▀   ▀▀▀▀▀   ▀▀▀▀▀     ▀▀    ▀▀▀▀▀▀ ▀▀   ▀▀ 


            For IBM PC and PC-XT/AT Compatible Computers,with           
                Hayes 1200/2400 - US Robotics 2400 modems               


                Greetings from Terminus.


 Scanners...aren't much to them..The idea is to select a range of numbers to
 call and look for lines that answer with carriers..Nothing fancy..In later
 versions I will add 800 number support as they sometimes come in handy when
 looking for unix mainframes,or things to mess around with..
 
 Configure the damned thing first.
 
 The only supported baud rates are 300 and 1200...When 2400 dial ups are more
 common,I'll add 2400 baud support..If people complain I'll add it sooner..
 
 Since each scan run is totally different from the last,I didn't include a
 configuration file loader..if you want it,let me know..
 
 
 i.e. if you set 'EXIT TO DOS: Y' and you have chosen TIMED SCANNING,with a
      time to stop scanning,at that time,it'll drop to dos,and you are back
      in control..previous versions of this beta series did a warm boot but
      I changed my mind about that...< ctrl-alt-del >..wasn't a good idea.
      Also,if you specify say,a starting number of 0000 and ending number of
      1000 when it reaches XXX-1000 it will drop to dos and you are back into
      a batch file.

 
 Please refer to the main help file for configuring the modem..it is critical
 that your modem support dtr control and you set the switches exactly as I
 specify..I hang up the bloody modem by dropping dtr,so you will understand
 why it has to be that way..
 

 CodeBuster is the *original* hacker for IBM machines,and I am happy to see
 it's widespread use among pirates and phreaks..Please feel free to make
 constructive comments known to me,as I can only think of so many things,and
 I am sure there is room for improvement..
 
 BTW,I do direct ram writes to screen display for speed..once it is in hacking
 /scanning mode it will not overwrite your foreground areas..
 
 I can be found on better IBM systems throughout continental North America.
 
 I wish I could give you a truly definite point of contact,but that would be
 foolish,wouldn't it?
 
                      Terminus  (301 npa)

u a truly definite point of contact,but that would be
 foolish,wouldn't it?
 
                      Terminus  