-skelet : skelet without endpixels
At each iteration 1 layer is 'pealed' of
the object, keeping the topology.
command : -skelet # times, bitplane, rand 
default : -skelet    100 ,    1    ,   0
range   :         <1,512>,  <1,8>  , <0,1>
