lmin    : determines a minimum image in a
local environment. The (environmental) size
may be an odd value between 1 and 15.
command: lmin in_image, out_image, size
default: lmax     A   ,     B    ,  3
range  :        <A,B> ,   <A,B>  ,<1,15>

