lmax    : computes a maximum image for a
local neighbourhood. The (neighbourhood) 
size is an odd value between 1 and 63.
command : lmax in-image, out-image, size
default : lmax     A   ,     B    ,   3
range   :        <A-D> ,   <A-D>  , <1,63>
