
 Progress charts are used to keep track of your
 improvement over time.  After each exercise
 session a progress score is calculated based on
 your performance.

 The progress score is determined by a number of
 factors. These factors include the number of
 drills you answer correctly, your average
 timing and sustain accuracy, the current tempo,
 and the number of included note components used
 to construct the drills.

 As each factor increases, your progress score
 increases. It is important to note that the
 significance of the progress score lies in
 the improvement over time, not in the number
 itself.


 There are two ways to open a progress chart. The
 first is from the Progress menu, and the second
 is from the Exercise Summary dialog box:


  1. Pull down the Progress menu.

     The menu lists each of RhythmAce's non-custom
     exercises.

  2. Select the exercise to view.

  3. When you are finished viewing the chart,
     select OK.



 You may also open an exercise chart from the
 Exercise Summary dialog box which appears at the
 end of an exercise session.

 To open the progress chart of the current
 exercise from the Exercise Summary dialog box,
 select the Progress button. Select OK when you
 have finished viewing the chart.



             INTERPRETING THE CHART

 When you read the chart, the vertical lines
 represent a single exercise session. The
 horizontal axis is time, and the vertical axis
 is the progress score. The lighter colored line
 running across the vertical lines averages your
 score over time. In the left corner of the chart
 is your highest progress score for this
 exercise.
                     (END)
