

 The Skill Levels available in the Level menu
 provide a convenient method to set options
 that correspond to pre-defined stages of
 development. Each Skill Level corresponds to
 various option settings. There are twelve levels
 to choose from, with Level 1 being the easiest
 to Level 12 being the most difficult.




 To set a Skill Level, follow these steps:

  1. Pull down the Level menu and select the
     desired Skill Level.
     RhythmAce warns you that the current
     options are reset to conform with the
     selected level.

  2. Click OK.

                     (END)
