Specify the name of the sequence you want to load and the
name of the song in which it resides.

Full DOS paths are accepted for the song name.

Example :
         To load sequence BASS-BARS-1-8  from  song TIMEAFTR
         and the song is stored on the disk in the A drive in
         subdirectory ROCK  then.....

         enter BASS-BARS-1-8  in the sequence name field

         enter A:\ROCK\TIMEAFTR  in the song name field.

Note:    You can change the name of the sequence as it is being loaded
         by specifying what you want the name to be after the sequence
         is loaded.
