Enter the name of the sequence to print or put a  "*"  in the name
field to print all sequences.

This feature will put the sequence on the monitor via Edit.
It then prints from the monitor.

Do not press enter until the PRINT SEQUENCE screen shows again.

You can pick from a list of tracks currently in memory by
pressing F2.
