COMPUSERVE'S
VENEZUELA-Connect

Venezuela - USA NETWORK SERVICE
Reference Guide

Accessing the CompuServe Information Service through the Venezuela network incurs a communications surcharge. (Details of this surcharge can be found by entering GO RATES at any ! prompt.) The following log-on instructions can be used to access CompuServe through this network.

ACCESS INSTRUCTIONS

1. Dial the Venezuela network telephone access number in Caracas or Valencia. Listen for the continuous, high-pitched tone. Redial if you do not hear this tone.

2. When connected enter a carriage return <CR> and type a period, followed by another carriage return:

<CR>.<CR>

3. You will then be connected to the CompuServe Host via the Venezuela network. The following network message is displayed followed by a User ID prompt:

BIENVENIDOS A COMPUSERVE VENEZUELA
fac: p(128,128),w(2,2),d(9600,9600)
com

4. Enter your User ID number at the "User ID" prompt.

5. Enter your password at the "password:" prompt.

Logging off VNZ NET:

1. After typing OFF at any ! prompt, your screen shows:

Host Name:

2. You type:

OFF <CR>

At which point you will be disconnected from CompuServe's network. You will also automatically be disconnected from VNZ-NET.