BT TYMNET-OMAN

To access CompuServe through the BT Tymnet network in Oman, follow the instructions below. GO RATES to view current information on communication surcharges.

LOGON INSTRUCTIONS:

1. Establish a phone connection by dialing the BT Tymnet (TYM) access number listed under "List Access Numbers" from the previous menu.

2. Once the connection has been made, your screen will show "PLEASE ENTER YOUR TERMINAL IDENTIFIER." Type the letter A. You do not need to press Enter or Carriage Return <CR>. Please note: the A will not appear on your screen.

3. At the "PLEASE LOGIN" prompt, type the letters CPS and press Enter or Carriage Return <CR>.

4. At the "User ID:" prompt enter your User ID number and log on as usual.

Example:

YOUR SCREEN SHOWS:

please enter your terminal identifier.

YOU ENTER:

A (no carriage return)

YOUR SCREEN SHOWS:

please log in

YOU ENTER:

CPS <CR>

YOUR SCREEN SHOWS:

HOST: Welcome to CompuServe 3373

USER ID:

LOGGING OFF:

To log off from the CompuServe Information Service, type OFF at any ! prompt online.

ex: ! OFF <CR>

Or, if you are using the Information Manager software, select "Disconnect" from the "File" pull-down menu.