SPRINTNET-WORLD

NOTE: If you are using the CompuServe Information Manager, select SPECIAL and then select SPRINTNET for the network under the Session Settings option. You may then proceed with access. If you are not using CIM, then please follow the directions outlined below.

SprintNet offers dial-up access to the CompuServe Network at speeds up to 9600 baud. Once a connection is established, you must press <CR>.<CR> if you are connecting at 300 or 1200 baud. If you are connecting at 2400 or 9600 baud, type an @ followed by a period (@.), then press Enter.

SprintNet's TERMINAL= prompt will then be displayed. At this prompt, enter the characters D1, then press Enter.

An "@" prompt will be displayed. At this prompt, enter the CompuServe destination address (listed below), then press Enter.

C 202202

You will then be connected to the CompuServe Information Service and the User ID: prompt will be displayed. Enter your User ID and logon as usual.

LOGGING OFF

1. After disconnecting from your host computer, your screen displays:

<network address> Disconnected

NOTE: If you do not automatically receive a "disconnected" message, you enter:

<CR>@<CR>

2. Your screen then displays:

@

3. You enter:

D<CR>