ITALY-Connect

CompuServe's partnership with the SEVA Network provides for dial-up network access throughout Italy to hosts on CompuServe at speeds up to 9600bps.

Logon Instructions (ASCII Users)

1. Establish a phone connection by dialing the nearest SEVA access number.

2. You type:

<CR>

3. Once the connection has been made your screen will show:

SEVA LOGIN:

4. You type:

CSERVE-41<CR>

5. Your screen shows:

CONNESSO

Host Name:

which is CompuServe's network prompt. At this point, enter is CIS followed by a <CR> after which you will see the User ID prompt. Enter your User ID and log on as usual.

Logging Off SEVA:

1. After typing off at any ! prompt, your screen shows:

Host Name:

2. You type:

OFF <CR>

At which point you will be disconnected from the CompuServe and SEVA network.