EQUANT

CompuServe's partnership with Equant International Telecommunications
Services, Inc. provides asynchronous dial-up network access worldwide
at speeds of 1200-28,800 bps.

ACCESS INSTRUCTIONS

1. Establish a phone connection by dialing the nearest EQUANT network access number which are listed under the access number menu option.

2. Once the connection is made, type:
.<CR>
i.e. period followed by a Carriage Return

3. Your screen will show:

SITA NETWORK: 2431 020

4. You type:

NUI 19730001<CR>

5. Your screen shows:

SITA NETWORK: password

6. You type:

KHS9NE<CR>

(Note: the password will not echo to your screen as you enter it)

7. Your screen shows:

SITA NETWORK: network user identifier 19730001 active

8. You type:

2111855<CR>

9. You will then be connected to CompuServe's network and the CompuServe's Host Name: prompt will appear on your screen:

Host Name:

At this point, enter CIS followed by a carriage return (<CR>) after which you will see the User ID prompt. Enter your User ID and log on as usual.

Logging Off EQUANT's network:

1. Type OFF at any ! prompt online to disconnect from the service. After logging off, your screen shows:

Host Name:

2. You type:

OFF <CR>

At which point you will be disconnected from CompuServe's network. You will also automatically be disconnected from EQUANT's network.