IRELAND-Connect
EIRPAC Network

To access CompuServe through the EIRPAC Network in Ireland, follow the
instructions below. GO RATES to view current information on communication surcharges.

LOGON INSTRUCTIONS:

1. Establish a phone connection by dialing the appropriate Eirpac access number for the the baud rate you want (listed on the previous menu "List Access Numbers").

2. Once the connection has been made you type:

...<CR>
i.e. 3 periods followed by a Carriage Return

NOTE: You only need enter the first step above if dialing at 300 bps, 1200 bps or 2400 bps without error correction. If you are dialing at 2400 bps with error correction or 9600 bps you do not need to enter ...<CR>.

3. Your screen shows:

EIRPAC: 50 1 3 0300

(The banner will vary depending on your location and the baud rate used)

4. You type:

r 37456178<CR>

5. Your screen shows:

EIRPAC: call connected to 37 4 5 6178
(001) (n,remote charging,packet size:128)

Host Name:

Host Name: is CompuServe's network prompt. To connect to the CompuServe Information Service, enter is CIS followed by a carriage return <CR> after which you will see the User ID prompt. Enter your User ID and log on as usual.

Logging Off Eirpac:

1. After typing OFF at any ! prompt, your screen shows:

Host Name:

2. You type:

OFF <CR>

At which point you will be disconnected from CompuServe's network. You will also automatically be disconnected from Eirpac.

Or, if you are using the Information Manager Software, select "Disconnect" from the "File" pull-down menu.