COMPUSERVE'S Canada - USA Network Service

ACCESS INSTRUCTIONS

IN CANADA:
1. Establish a phone connection by dialing the CompuServe access number listed under "List Access Numbers" on the previous menu.

2. Once the connection has been made, enter:

<CR>

3. Your screen displays CompuServe's network prompt as seen below. At this point, enter CIS followed by a <CR> after which you will see the User ID prompt. Enter your User ID and log on as usual.

Host Name:

LOGGING OFF

1. To log off from the CompuServe Information Service, type the following:

OFF <CR>

At which point you will be disconnected from CompuServe's network.