COMPUSERVE NETWORK

To access CompuServe through the direct-dial CompuServe Network in Belgium, follow the instructions below. GO RATES to view current information on communication surcharges.

LOGON INSTRUCTIONS:

1. Establish a phone connection by dialing a CompuServe (CPS) access number listed under "List Access Numbers" from the previous menu.

2. Once the connection has been made, wait for 3-4 seconds, then press Enter or Carriage Return <CR>.

3. At the "Host Name:" prompt, type CIS and press Carriage Return.

4. At the "User ID:" prompt, enter your User ID number and log on as usual.

example: CONNECT 2400
<CR>

17ACK

Host Name: CIS <CR>
User ID:

LOGGING OFF:

To log off from the CompuServe Information Serivce, type OFF at any ! prompt online.

ex: ! OFF <CR>

Or, if you are using the Information Manager software, select "Disconnect" from the "File" pull-down menu.