COMPUSERVE'S ARGENTINA-Connect

CompuServe's partnership with Argentina Net in Argentina provides for asynchronous dial-up network access throughout Argentina to CompuServe via the Argentina network at speeds up to 28,800bps.

ACCESS INSTRUCTIONS

1. Connect to Argentina Net.

Establish a phone connection by dialing the appropriate access number listed under "List Access Numbers".

2. Once the phone connection has been made, your screen shows:

Bienvenido

User Access Verification

Username:

At the "Username" prompt enter the following letters then press enter <CR>:

cps <CR>

3. Your screen shows after a few seconds:

Password:

At this prompt, type "cis" and press <CR>, the screen will show:

User ID:

At this point, enter your User ID then press Enter <CR> and log on as usual.

LOGGING OFF:

To log off from the CompuServe Information Service, type OFF at any ! prompt online.

ex: ! OFF <CR>

Or, if you are using the Information Manager software, select "Disconnect" from the "File" pull-down menu.