          FILE: JK.HLP 

          From the 1st tee at Leslie Park, a beautiful course in Ann 
          Arbor, John had just blasted an unbeliveable drive right down 
          the middle of the fairway.  A strong tail wind whipped up and 
          carried the ball right onto the green some 432 yards from the tee. 

          "Not bad?" Kasey commented, "Now I'll take my practice shot 
          and we can get started." 

  
