    The DBK Rating                                 FILE: HR.HLP 
                                                                           
    After the initial version of DBK was running, we found ourselves 
    looking for a net-net.  A final result.  A who done better type of 
    thing.   We wanted to know how a person was doing even if they 
    didn't have a handicap. So this is what we came up with. 
                            
    The DBK Rating was developed for all those golfers that spend most 
    of the season playing 9 hole rounds; and consequently with no legal 
    handicap.  The player rating is a unitless factor that combines 
    course length and strength level and the A.P average. 
                                                          
    Like strength level, this value is also highly correlated with 
    scoring ability.   To give you a better idea of what your DBK Rating 
    is worth, the bottom of th report contains a rating system.  How 
    does DBK see your game? 
                      
    If your DBK Rating is over 8.0, please give us a call - we would 
    like to speak ith you.
