    Output  - Where and How                           FILE: FO.HLP
                                                                            
    The output generated by DBK can be directed to one of three 
    destinations. 
                                                                
    LPT1 - The first and most common is the primary parallel port.  This 
    is   the port that you should select if you have only one printer.  
                                                                
    LPT2 - For those of you with a second printer, DBK can print to that 
    one  just as easily.
                                                                
    DISK - Disk files are also available if you want to get a quick look 
    at   your status without grinding out a ream of paper.  The files 
    written are  of the ASCII variety which means that any standard text 
    editor or word    processor can read them.   The files are created 
    with the same filename   as the .GLF file execpt that the extension 
    is changed to .SUM.            
                                                                
    Columns Required: 132                                                     
                                                                
    Remember that DBK needs 132 columns of output for all reports.  This 
    means that if you have a narrow carriage daisy wheel, you might have 
    a problem. Almost all dot matrix printers have a condensed print 
    mode which should   be adequate.   See the help screen under 
    Features titled Utilities for    more info on sending condensing 
    codes.                                    

