PRO
Programs can be selected in two different ways:
  1. Pressing a letter 'A' through 'P' causes that
     selection to execute.
  2. Pressing <RETURN> will cause the currently
     highlighted selection to execute.

The cursor keys position the cursor in the following ways:
  HOME: moves the cursor to SELECTION 'A', page 1
  END : moves the cursor to SELECTION 'P', page 4
  PGUP: advances to the next page, same selection
  PGDN: advances to the previous page, same selection
EOF
SYS
SYSMAN provides access to the functions shown providing
the user has the required password.

The selections are made by positioning the cursor (with
the <up> and <down> cursor keys) at the desired function
and pressing <return>.
EOF
PAS
There are two levels of password security within PROMAN.

The system level allows password protection for certain
PROMAN functions (The change password function relates to
this password).

The user level allows individual password protection for
each program record contained within PROMAN.
EOF
MEN
Choices can be selected in two different ways:
  1. Pressing a letter 'A' through 'P' causes that
     selection to edited.
  2. Pressing <RETURN> will cause the currently
     highlighted selection to be edited.

The cursor keys position the cursor in the following ways:
  HOME: moves the cursor to SELECTION 'A', page 1
  END : moves the cursor to SELECTION 'P', page 4
  PGUP: advances to the next page, same selection
  PGDN: advances to the previous page, same selection
EOF
LON
The LOGON function allows multiple users or multiple
projects to be tracked.  An user MUST be entered in order
for USAGE TRACKING to work correctly.

At the USER prompt enter your name and press <return>.
At the LOG  prompt enter your project and press <return>.

Pressing <ESC> will abort this operation.
EOF
LOF
The LOGOFF function allows multiple users or multiple
projects to be tracked.  An user and a log MUST be entered.

At the USER prompt enter your name and press <return>.
At the LOG  prompt enter your project and press <return>.

NOTE: This function cannot be aborted.
EOF
SET
SET TIME and DATE allows the user to change the PROMAN
system TIME and DATE.

It does NOT change the battery backup TIME and DATE.

This function is not password protected and can be aborted
with the <ESC> key.
EOF
USE
Usage Tracking allows the PROMAN system manager to
generate reports of the system usage.

The usage can be sorted by USER, PROJECT (LOG), DATE, and
APPLICATION.  Any one of these can be entered for the
PRIMARY sort key and one of those remaining can be entered
for the SECONDARY sort key (OPTIONAL). The reports can be
output to either the screen or a printer.

This function can aborted with the <ESC> key until sorting
is in progress after which the <RETURN> key will abort.
EOF
RES
This function irrevocably deletes all the current records
from the USAGE LOG.

This function is password protected and can be aborted
with the <ESC> key (only BEFORE confirmation).
EOF
CHA
This function allows the PROMAN System Manager to change
the system PASSWORD.  The old password is required and the
new password must be verified before the program file will
be updated to reflect the new password.

<ESC> aborts this function.
EOF
ENC
The encryption/decryption utility allows for KEY encrypted
data security.

By using DOS file specifications you may encrypt/decrypt a
single file, a group of files (within a directory), or an
entire directory.

NOTE: Once started the encryption cannot be aborted. If
you reset during the encryption the current file will be
lost!
EOF
SHU
This function allows you to execute any FIXED DISK HEAD
PARKING utility.

Enter the PATH and FILE name.  PROMAN will check that the
information input is correct and then save it.

Once executed the only way to restart your system is by
resetting or turning the power off and on again.
EOF
EDI
This is where the PROGRAM information for PROMAN is
entered and edited.

The encryption utility allows you to have automatic
encryption and decryption when this program is executed.

The following keys have special function within the editor:
<ESC>: Exits the operation without changing the information
<DEL>: Deletes the current field.
^D   : Deletes all the information within this record.
<END>: Exits the operation and changes information upto the
       current field.
EOF