OVERVIEW  -  This  screen  enables  you  to change the Date Format set for
use within "TGL".

VALID OPTIONS -
A - presents the Date in the DD/MM/YY format.
B - presents the Date in the MM/DD/YY format.

ENTER  YOUR  SELECTION (A-B OR Q) OPTION - To change the Date Format press
    the letter corresponding to the Date Format you wish to use.

"Q" for Quit returns you to the System Setup menu.

CURRENT  DATE  FORMAT  -  The  System  will  confirm  the Date Format you
have selected by displaying a message at the bottom of the screen.
