OVERVIEW

This screen enables you to change the Date used by TGL. You can change the
date by overwriting the CURRENT DATE field on this screen and pressing ENTER.

The first time into TGL the date is the current DOS date.

CURRENT DATE - To Change the Date use the arrow keys to edit the day, month
or year  and  Press  Return or overtype the date displayed and press Return.
You will be returned to the Extended Options Menu.

The Date can be entered either in the DD/MM/YY format or the MM/DD/YY format.
To change the current format, enter the System by accepting the current date
and select "L" for Extended Options, then "B" for Date Format selection.

Accept the date by pressing ENTER.
