                ------- ROTATE (EXPERT Function Key) -------


This is a function key that exists within the EXPERT functions (see EXPERT   
function key).
--  The ROTATE function key allows you to rotate a portion of your drawing,
    in place either clockwise or counter-clockwise (1-359 degrees).
 
--  After you press the ROTATE function key, you will be prompted to define
    the CIRCULAR area of the drawing you are rotating.  To define the area,    
    you will use the cursor keys and the following function keys.
 
    NOTE  A large flashing "+" should appear on the screen,
          and this is what you will be manipulating to define the
          area you are rotating. 
 
    NOTE  Also a small flashing "x" will appear at the top of the "+".
          This is used to indicate the amount of rotation; exactly
          at the top is zero degrees of rotation.
 
    --  CSPEED....when moving the "+" with the cursor keys, move one dot 
                  position at a time or eight (it starts at 8 dots at a time)
    --  SIZECHG...when changing the size of the circular area, do it one dot
                  position at a time or eight (it starts at 8 dots at a time)
    --  CLOCK1....change the indicated amount of rotation clockwise
                  by one degree
    --  CLOCK9....change the indicated amount of rotation clockwise
                  by nine degrees
    --  CTRCLK1...change the indicated amount of rotation counter-clockwise 
                  by one degree 
    --  CTRCLK9...change the indicated amount of rotation counter-clockwise 
                  by nine degrees
    --  SHRINK....make the size of the circular area smaller
    --  ENLARGE...make the size of the circular area larger
    --  ABORT.....cancel the rotate operation
    --  COMMIT....pressing this key says go ahead and rotate the specified area
                  the amount indicated 
ion
    --  COMMIT....pressing this key says go ahead and rotate the specified area
                  the amount 