                ------- MOVE (EXPERT Function Key) -------


This is a function key that exists within the EXPERT functions 
(see EXRERT function key).

--  The MOVE function key allows you to move a portion of your drawing,
    and shrink or enlarge it at the same time. 
 
--  After you press the MOVE function key, you will be prompted to define
    the area of the drawing you are moving.  To define the area, you
    will use the cursor keys and the following function keys.
 
    NOTE  A four-cornered flashing box should appear on the screen,
          and this is what you will be manipulating to define the area you
          are moving, the location to which you are moving it, and its size.
 
 
 
    -- CSPEED1...when moving the box with the cursor keys, move one dot 
                 position at a time
    -- CSPEED8...when moving the box with the cursor keys, move eight dots
                 position at a time
    -- BOXCHG1...when changing the dimensions of the box, 
                 change the dimension by one dot position at a time
    -- BOXCHG8...when changing the dimensions of the box, 
                 change the dimension by eight dot positions at a time
    -- WIDER.....make the box wider
    -- THINNER...make the box thinner
    -- TALLER....make the box taller
    -- SHORTER...make the box shorter
    -- ABORT.....cancel the move operation
    -- COMMIT....pressing this key indicates that the box on the screen
                 represents the exact area you want to move
    
 
 
 
--  After pressing the COMMIT key, you will be prompted for where you
    want to move the defined area; you also have the opportunity
    at this time to increase or decrease the size of the area being
    moved.  To do these things, the following function keys have
    been provided (as well as the cursor keys). 
 
    -- CSPEED1...make box-cursor movement only 1 dot at a time
    -- CSPEED8...make box-cursor movement 8 dots at a time
    -- SHRNK10...shrink the area 10%  (indicated by the size of the box)
    -- SHRNK1....shrink the area 1%   (indicated by the size of the box)
    -- ENLRG10...enlarge the area 10% (indicated by the size of the box)
    -- ENLRG1....enlarge the area 1%  (indicated by the size of the box)
    -- ABORT.....forget about this move operation
    -- COMMIT....The box is where I want the area I defined moved to
                 and it is the size I want the area to be...
                 so go ahead and actually do the move.

 
   *** IMPORTANT NOTE  follows on the next help screen
   *** IMPORTANT NOTE  The MOVE function does not move every single
                       dot within an area to another area, rather
                       it reassigns the end points of lines, curves. etc.
                       This maintains the continuity of your drawing
                       and doesn't have the problem some graphics
                       systems have of "tearing off" one part of
                       your drawing and placing it some where else.
                       Instead, this function "logically" redraws
                       the specified area of your drawing where  
                       and the size you want it to be.        
                   the specified area of yo