              ------- FLIP (EXPERT Function Key) -------


This is a function key that exists within the EXPERT functions 
(see EXRERT function key).

--  The FLIP function key allows you to define an area of your drawing
    and cause that area to become the mirror image of itself (left to right).
 
--  Defining the area to be flipped is identical operationally to BRIBOX. 
    (Refer to the help for BRIBOX for additonal help.) 
fining the area to be flipped is identical operationally to BRIBOX.