               ------- CONVRG (Function Key) -------


--  Sometimes you may want to connect two existing figures on the screen 
    at their endpoints.  Even through the use of FIND PT/MOVE PT,
    you may only be able get the endpoints very near to one another because
    the high degree of detail provided in high-res graphics makes it 
    difficult to cause these figures to come together at the exact 
    same point.

--  By using CONVRG (converge) after placing the cursor between the 
    endpoints of the two figures, this progam will pull the two
    figures together.

    NOTE  Literally it will bring the endpoints of all figures that
          are within 2 horizontal and 2 vertical dots of the cursor
          to the location of the cursor.

    NOTE  Before a CONVRG can be effective, the endpoints must have
          been brought very close together (5 dots maximum).

          Then the cursor must be properly placed between them.
       
          Then and only then will pressing the CONVRG function key 
          be effective.
y placed between them.
       
          Then and only then will press