
The VERIFY command is provided so that you can instruct DOS to verify all
disk write accesses have been performed successfully.

VERIFY [ON | OFF]

*  The verify state remains unchanged until another VERIFY command is entered
   or the system is restarted.  The normal (default) verify state is OFF.
*  Entering the command without parameters displays the current verify state.
*  Verification may be enabled on a command by command basis using COPY with
   the /V option.
