
The TIME command allows you to set or change the time known to the system.

TIME [hh:mm:ss.ff]

where:
  hh  = Hour from 0 to 23.
  mm  = Minute from 0 to 59.
  ss  = Second from 0 to 59.
  ff  = Fractions (or hundredths) of a second from 0 to 99.

*  Entering the command without parameters displays the current setting, and
   prompts for a new time.
*  If the Enter key is pressed as the first key, the time remains unchanged.
*  Any unentered fields will be set to zero.
