
The SORT command is used to sort information on a line by line basis in
ascending or descending order.

SORT [/R][/+n]

options:
  /R   - Reverse the sort order to descending.
  /+n  - The "n" value is an integer column number to start the sort of each
         line on.

*  Information is read from the standard input device, sorted and written to
   the standard output device.
*  The maximum file size that can be sorted is 63 K bytes in length.
