If you have a PCjr equipped with a 62 key keyboard, you will be well aware
that the keys that are referenced in the DOS manuals and the documentation in
many software packages does not mention your keyboard directly.  This is a
quick reference of what keys on your keyboard correspond to the keys on the
full 83 key IBM PC keyboard.  In the following table, a hyphen "-" between
keys indicates that the separated keys must be pressed at the same time as one
keystroke.

IBM PC Keyboard      PCjr Keyboard      |  IBM PC Keyboard      PCjr Keyboard
---------------      -------------      |  ---------------      -------------
\                    Alt-/              |  PrtSc                Fn PrtSc
|                    Alt-[              |  Ctrl-PrtSc           Fn Echo
`                    Alt-'              |  Home                 Fn Home
~                    Alt-]              |  PgUp                 Fn PgUp
NumLock              Alt-Fn N           |  PgDn                 Fn PgDn
Ctrl-Break           Fn Break           |  End                  Fn End
Ctrl-NumLock         Fn Pause           |
ScrollLock           Fn ScLock          |

F1 to F10            Fn F1 to F10
Shift-F1 to F10      Shift-Fn F1 to F10
Ctrl-F1 to F10       Ctrl-Fn F1 to F10
Alt-F1 to F10        Alt-Fn F1 to F10
