

                   ²±° Deleting Variables °±² 



You may delete up to n-1 variables in you data file.  Where n  is
the actual number of variables in you data file.  For example, if
your data file has 12 variables you may delete any 11 of them.

In  order  to  delete  variables  mearly  press  'y' to the those 
variables presented to you for deletion.  Note that pressing  any
other key will NOT delete that variable. 

Once you have made all the changes you wish to make and decide to 
exit you will be asked if you wish to save the changes.  This  is
also true if you reach the end of your list of variables.  

