REFLIST.DEF     {Items in braces will be functional in version 4.0}
Citation flag:

Master list of references is in:
MASTFILE.DTA
{}
{}
{Line length}, {Indentation of later lines}, spacing, {justification}:
65,3,3,n
American Economic Review
Alphabetized 
No max no. of authors
~~Sorsdahl~, ~O~.~A~., ~Williams~, ~C~.~M~. and ~Bruno~, ~F~.~P~., "~Scintillation camera scanning of the salivary glands~," ~Radiology~, ~1969~, ~92~, ~1477~-~80~.~~ 
., "~Scintillation camera scanning of the salivary glands~" in ~A~.~B~.~Sodeman~, ~C~. ~Weinstein~ and ~D~. ~Swartz~, ed~s~., ~Mechanisms of disease~, ~Philadelphia~: ~W B Saunders~, ~1969~.~~
. ~Ed~s~. ~~Histocompatibility testing~, ~New York~: ~Harper and Row~,  ~1969~.~~
American Journal of Orthopsychiatry
Alphabetized
6,3, et al
1.~ ~SORSDAHL~, ~O~.~A~., ~WILLIAMS~, ~C~.~M~. AND ~BRUNO~ ~F~.~P~.~ 1969~. ~Scintillation camera scanning of the salivary glands~. ~Radiology~.~92~:~1477~-~1480~~ 
. ~1969~ ~Scintillation camera scanning of the salivary glands~ In: ~Mechanisms of Disease~. ~A~.~B~.~Sodeman~, ~C~. ~Weinstein~ and ~D~. ~Swartz~, Ed~s~.~: ~W B Saunders~ ~Philadelphia~.~~
. ~ed~s~. ~1969~: ~Histocompatibility testing~,  ~Harper and Row~. ~New York~.~~
American Psychologist
Alphabetized
No max no. of authors
Sorsdahl~, ~O~.~A~., ~Williams~, ~C~.~M~., & ~Bruno~, ~F~.~P~. ~(~1969~). ~Scintillation camera scanning of the salivary glands~. ~Radiology~, ~92~, ~1477~-~1480~.~~
. (~1969~). ~Scintillation camera scanning of the salivary glands~. In ~A~.~B~.~Sodeman~, ~C~. ~Weinstein~ , & ~D~.~Swartz~ (Ed~s~.), ~Mechanisms of disease~ (pp. ~1477~-~1480~). ~Philadelphia~: ~W B Saunders~.~~
. ~(Ed~s~.), ~(~1969~). ~Histocompatibility testing~. ~New York~: ~Harper and Row~.~~
Forest Science
Alphabetized 
No maximum number of authors
~SORSDAHL~ ~O~.~A~., ~C~.~M~.~WILLIAMS~ and ~F~.~P~.~BRUNO~. ~1969~. ~Scintillation camera scanning of the salivary glands~. ~Radiology~ ~92~:~1477~-~1480~.~~ 
. ~1969~. ~Scintillation camera scanning of the salivary glands~. P. ~1477~-~1480~. in ~A~. ~B~. ~Sodeman~ ~C~. ~Weinstein~ and ~D~. ~Swartz~ (ed~s~.), ~Mechanisms of disease~. ~Philadelphia~. ~W B Saunders~.~~
. ~ed~s~. ~1969~. ~Histocompatibility testing~. ~Harper and Row~, ~New York~.~~
Gene
Alphabetized 
No max no. of authors
Sorsdahl~, ~O~.~A~., ~Williams~, ~C~.~M~. and ~Bruno~, ~F~.~P~.: ~Scintillation camera scanning of the salivary glands~. ~Radiology~ ~92~ (~1969~) ~1477~-~1480~.~~ 
.: ~Scintillation camera scanning of the salivary glands~ in ~Sodeman~, ~A~.~B~., ~Weinstein~, ~C~., and ~Swartz~, ~D~. (Ed~s~.), ~Mechanisms of disease~,  ~W B Saunders~, ~Philadelphia~ ~1969~, ~pp. ~1477~-~1480~.~~
. ~(Ed~s~.) ~Histocompatibility testing~, ~Harper and Row~, ~New York~, ~1969~.~~
Journal of Climate and Applied Meteorology
Alphabetized
No max number of authors?
Sorsdahl~, ~O~. ~A~., ~C~. ~M~. ~Williams~ and ~F~. ~P~. ~Bruno~, ~1969~: ~Scintillation camera scanning of the salivary glands~. ~Radiology~, ~92~, ~1477~-~1480~.~~ 
, ~1969~: ~Scintillation camera scanning of the salivary glands~.  ~A~. ~B~. ~Sodeman~ ~C~. ~Weinstein~ and ~D~. ~Swartz~ (ed~s~.), ~Mechanisms of disease~, ~Philadelphia~, ~W B Saunders~, pp. ~1477~-~1480~.~~
, ~ed~s~, ~1969~: ~Histocompatibility testing~, ~New York~, ~Harper and Row~, ~~
Journal of Dental Research
Alphabetized 
No max no. of authors
SORSDAHL~,~O~.~A~.; ~WILLIAMS~,~C~.~M~.; and ~BRUNO~,~F~.~P~. (~1969~): ~Scintillation camera scanning of the salivary glands~, ~Radiology~ ~92~:~1477~-~1480~.~~ 
. (~1969~) ~Scintillation camera scanning of the salivary glands~ In: ~Mechanisms of Disease~. ~A~.~B~.~Sodeman~, ~C~. ~Weinstein~ and ~D~. ~Swartz~. Ed~s~.,~Philadelphia~: ~W B Saunders~, pp.~1477~-~1480~.~~
. ~ed~s~. ~(~1969~):~Histocompatibility testing~, ~New York~: ~Harper and Row~.~~
Journal of General Virology
Alphabetized
No max no of authors 
SORSDAHL~, ~O~. ~A~., ~WILLIAMS~, ~C~. ~M~. & ~BRUNO~ ~F~.~P~.~ (~1969~). ~Scintillation camera scanning of the salivary glands~. ~Radiology~ ~92~, ~1477~-~1480~.~~ 
. ~Scintillation camera scanning of the salivary glands~ (~1969~). In ~Mechanisms of Disease~. pp. ~1477~-~1480~. Edited by ~A~.~B~.~Sodeman~, ~C~. ~Weinstein~ and ~D~. ~Swartz~. ~Philadelphia~: ~W B Saunders~.~~
. ~ed~s~. ~(~1969~). ~Histocompatibility testing~, ~New York~: ~Harper and Row~.~~
Journal of the National Cancer Institute
Not alphabetized 
No max no. of authors
(1)~ ~SORSDAHL~ ~O~A~, ~WILLIAMS~ ~C~M~, ~BRUNO~ ~F~P~. ~Scintillation camera scanning of the salivary glands~. ~Radiology~ ~1969~; ~92~:~1477~-~1480~.~~ 
. ~Scintillation camera scanning of the salivary glands~ In: ~Sodeman~ ~A~B~, ~Weinstein~ ~C~, ~Swartz~ ~D~, ed~s~. ~Mechanisms of disease~. ~Philadelphia~: ~W B Saunders~, ~1969~:~1477~-~1480~.~~
. ~ed~s~. ~Histocompatibility testing~. ~New York~: ~Harper and Row~, ~1969~~
Language and Literature
Alphabetized
No max no. of authors
Sorsdahl~, ~O~.~A~., ~Williams~, ~C~.~M~., & ~Bruno~, ~F~.~P~., ~"~Scintillation camera scanning of the salivary glands~" ~Radiology~ ~92~(~1969~): ~1477~-~1480~.~~
., "~Scintillation camera scanning of the salivary glands~" in ~A~.~B~.~Sodeman~, ~C~. ~Weinstein~ , & ~D~.~Swartz~ ed~s~., ~Mechanisms of disease~ (~Philadelphia~: ~W B Saunders~, ~1969~).~~
., ~(ed~s~.), ~ ~Histocompatibility testing~ (~New York~: ~Harper and Row~ ~1969~).~~
Nature
Non alphabetized 
5,1,.  et al
1.~ ~Sorsdahl~, ~O~. ~A~., ~Williams~, ~C~. ~M~. & ~Bruno~, ~F~. ~P~. ~Radiology~ ~92~, ~1477~ (~1969~).~~
. ~Scintillation camera scanning of the salivary glands~ in ~Mechanisms of Disease~ (ed~s~ ~Sodeman~, ~A~. ~B~., ~Weinstein~, ~C~. & ~Swartz~, ~D~.) ~1477~-~1480~ (~W B Saunders~, ~Philadelphia~, ~1969~).~~
. ~(ed~s~) ~Histocompatibility testing~ (~Harper and Row~, ~New York~, ~1969~).~~
Virology
Alphabetized
No max no. of authors
SORSDAHL~,~O~.~A~., ~WILLIAMS~,~C~.~M~., and ~BRUNO~,~F~.~P~. (~1969~). ~Scintillation camera scanning of the salivary glands~. ~Radiology~ ~92~, ~1477~-~1480~.~~
. (~1969~). In "~Scintillation camera scanning of the salivary glands~" (~A~.~B~.~Sodeman~, ~C~ ~Weinstein~ and ~D~.~Swartz~, ed~s~.) , pp.~1477~-~1480~. ~W B Saunders~, ~Philadelphia~.~~
. ~ed~s~. ~(~1969~). "~Histocompatibility testing~." ~Harper and Row~, ~New York~.~~
Virus Research
Alphabetized 
No max no. of authors
Sorsdahl~, ~O~.~A~., ~Williams~, ~C~.~M~. and ~Bruno~, ~F~.~P~. (~1969~) ~Scintillation camera scanning of the salivary glands~. ~Radiology~, ~92~, ~1477~-~1480~.~~ 
. (~1969~) ~Scintillation camera scanning of the salivary glands~ In: ~Mechanisms of disease~, (~Sodeman~, ~A~.~B~., ~Weinstein~, ~C~., and ~Swartz~, ~D~., ed~s~.), pp. ~1477~-~1480~, ~W B Saunders~, ~Philadelphia~ .~~
.~ (ed~s~.)~ ~(~1969~) ~Histocompatibility testing~, ~Harper and Row~, ~New York~.~~

