                                EDITOR EXIT:

Type <ESC> key to exit the editor and enter the maintenance section.  A
YES/NO requestor will pop up asking you if you want to save your changes.
Type either 'Y' or 'y' to save edits; any other key to keep changes
temporarly in MenuEase. When MenuEase returns from the program that was
called, (batch mode only, see TECHNICAL CONSIDERATIONS in the manual) the
menu file *.qmn is read.  If you don't save your edits they will be lost.
Type <F3> to enter the main menu where you can test the changes.















