
   QAPlus    PC Diagnostics for the End User

     -  Advanced State of the Art Diagnostics for IBM PC's and
        compatible.
     -  User Friendly interface with pull down menu system with
        on line help.
     -  Available in Self Booting, Ideal for UNIX and ZENIX
        systems.
     -  Intruder Alert(tm) Virus detection built in for added
        security and protection.
     -  Complete system testing and performance information.
     -  Ideal for use by End Users yet detailed enough for
        Engineers.

   QAPlus/fe     Advanced PC Diagnostics for Field Engineers

     -  In depth system testing and reporting necessary for
        expert level diagnostics.
     -  System and Hard Disk performance testing.
     -  Compact, self contained, easy to use software and manual
        allow support for  all Intel based CPU systems.
     -  Extensively test and document any system hardware
        problems and suggest repair alternatives.
     -  Can be utilized with other software to supplement
        testing capabilities.

   Power Meter    The performance Measurement Standard for the
                  PC industry of the 90's.

     -  Monitors and measures the performance of IBM PC's and
        Compatible computers.
     -  Provides  a database for accurately comparing the
        performance of personal computer systems.
     -  Includes 22 additional tests including overall system,
        CPU, Memory, Disk, and Video Display performance.
     -  Useful for system managers to determine modifications
        and compatibility problems for individual user systems
        which affect overall performance.

   QAClean:       A Systems Approach to Floppy Disk Drive
                  Maintenance.

     -  User friendly menu system with simple 1 page
        instructions.
     -  Easy to use and environmentally safe materials.
     -  Provides maximum cleaning capability to ensure optimum
        floppy drive performance.
     -  Dual Media allows for use with all IBM platforms
        including XT, AT, 386, 486, and PS2 PC's.


   QAFloppy:      Professional Level Floppy Drive maintenance
                  and Repair Software.

     -  Easy to use software based product can be used by novice
        computer users as well as advanced technicians.
     -  No major tools or equipment are required. Does not
        require an oscilloscope.
     -  Full  automatic testing allows for quick and accurate
        testing without disassembly of the hardware.
     -  Manual testing allows for "REAL TIME" results of
        adjustments to ensure accuracy of floppy drives.
     -  Can be used for all IBM platforms from XT through PS2's
        and does not require VGA monitor.

