 Power Meter is a powerful software utility for IBM and compatible 
 personal computer systems that enables you to measure and compare 
 overall system performance as well as the performance of the 
 CPU/memory, disk drive, and video display subsystems.

 Perhaps the most important benefit of Power Meter is that it enables 
 you to compare test results simultaneously across many systems and 
 components. Test results alone are not enough if they cannot be 
 compared quickly in order to make timely hardware purchasing decisions. 
 Power Meter's integrated menu and help systems, tests, utilities, and 
 database of test results provide the tools that you need to make those 
 tough decisions.

