// ==> PATCH.DEF
// This file is the defination file for installation procedure INSTALL.EXE.
// Note:
//  1. After installation, install.exe will be renamed to be setup.exe,
//          configuration file will be generated as   SETUP.CFG
//  2. Installation will read "READ.ME" page by page for special notice.
[Header]
Drive=          C:              //Dest Drive (user changable)
Dir=            C2        //Dest Directory (user changable)
Exe=            C2            //Executable file
Title=          Caesars II   //Title
Version=         .99            //Version
Disks=          3               //Disks to be installed
HardDrive=      8 M             //requirement
RAM640=         0 K            //requirement
RAMext=         0 M             //requirement
Sound=          NO              //support sound
Printer=        NO              //support printer
SVGA=           Yes              //using SVGA mode
CD_ROM=         NO              //support CD ROM version(Source Drive)
Patch=          Yes

[Disk 1]
Id=DISK1                        //check file existance for the correct disk
MD={Drive}{Dir}
copy=lha.exe,       {Drive}{Dir}
copy=patch.def,     {Drive}{Dir} 
copy=install.def,   {Drive}{Dir}
copy=install.exe,   {Drive}{Dir}
copy=check.exe,     {Drive}{Dir}
copy=update.bat,    {Drive}{Dir}      
copy=read.me,       {Drive}{Dir}      
Unzip=split001.lzh, {Drive}{Dir}\

[Disk 2]
Id=DISK2                        //check file existance for the correct disk
Unzip=split002.lzh, {Drive}{Dir}\


[Disk 3]
Id=DISK3                        //check file existance for the correct disk
Unzip=split003.lzh, {Drive}{Dir}\






