
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█                                                                             █
█                                                                             █
█  The EtherLink II adapter is supported by the Novell NetWare 386 network    █
█  operating system.  The adapter driver can be loaded after a standard       █
█  NetWare 386 installation.  To install the adapter for the first time,      █
█  use the standard NetWare 386 installation, instead of this utility.        █
█                                                                             █
█  This utility program will update the EtherLink II adapter driver           █
█  (LAN driver) on an existing NetWare 386 server.  It will update the DOS    █
█  partition, or optionally the SYSTEM directory of the SYSTEM volume.  This  █
█  utility program must be run on each Netware 386 server with an             █
█  EtherLink II adapter installed.                                            █
█                                                                             █
█  To update the DOS partition, "DOWN" the server and exit to DOS.  Run       █
█  this utility from the DOS partition.  To update the SYSTEM volume, login   █
█  as supervisor.  Make sure to map to the SYSTEM directory.  Use the         █
█  path including the drive mapped to this directory for the target path.     █
█  The entire path must be entered.                                           █
█                                                                             █
█  This utility will only work for NetWare 386 versions 3.10 and 3.11.        █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█



