
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█									      █
█  The EtherLink II adapter is supported by the IBM OS/2 Extended Edition     █
█  (OS/2 EE) network operating system.  The adapter can be selected during    █
█  a standard OS/2 EE installation.                                           █
█									      █
█  The utility program supplied on the EtherDisk diskette allows you to       █
█  update the EtherLink II adapter driver in an OS/2 EE system to the         █
█  driver's currently released version.  Running the program on a computer    █
█  with OS/2 EE already installed will automatically install the latest       █
█  driver from the EtherDisk diskette into the system.                        █
█									      █
█  This utility program will only work with OS/2 Extended Edition version     █
█  1.2.  Make sure the adapter drivers are located in the directories they    █
█  were placed in during the initial installation.  If the drivers are        █
█  located in non-standard directories, you must manually copy the new        █
█  drivers from the EtherDisk diskette to these non-standard locations.       █
█                                                                             █
█                                                                             █
█                                                                             █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

