
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█  The EtherLink II adapter is supported by the Microsoft LAN Manager         █
█  network operating system.  The adapter can be selected during a standard   █
█  LAN Manager installation.                                                  █
█									      █
█  The utility program supplied on the EtherDisk diskette allows you to       █
█  update the EtherLink II adapter drivers in a LAN Manager system to the     █
█  drivers' currently released version.  Running the program will             █
█  automatically install the latest drivers from the EtherDisk diskette onto  █
█  all computers (servers, DOS workstations, and OS/2 workstations) running   █
█  LAN Manager with an EtherLink II adapter installed.  Also, run the         █
█  program on all LAN Manager systems from which installations will be made   █
█  or that will act as a Remoteboot server for systems that contain an        █
█  EtherLink II adapter.                                                      █
█									      █
█  This utility program will only work with Microsoft LAN Manager version     █
█  2.0.  Make sure that the adapter drivers are located in the directories    █
█  they were placed in during the initial installation.  If the drivers are   █
█  located in non-standard directories, you must manually copy the new        █
█  drivers from the EtherDisk diskette to these non-standard locations.       █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

