
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█                                                                             █
█  The EtherLink II adapter is supported by the 3Com 3+Open LAN Manager       █
█  network operating system.  The adapter can be selected during a standard   █
█  3+Open NOS installation.                                                   █
█									      █
█  The utility program supplied on the EtherDisk diskette allows you to       █
█  update the EtherLink II adapter drivers in a 3+Open system to the          █
█  drivers' currently released version.  Running the program will             █
█  automatically install the latest drivers from the EtherDisk diskette       █
█  into all computers (servers, DOS netstations, and OS/2 netstations)        █
█  running 3+Open with an EtherLink II adapter installed.  Also, run the      █
█  program on all 3+Open PC servers from which installations will be made     █
█  (including netstation startup diskette generation) for systems that        █
█  contain an EtherLink II adapter.                                           █
█									      █
█  This utility program will only work with 3+Open LAN Manager version 1.1.   █
█  Make sure the adapter drivers are located in the directories they were     █
█  placed in during the initial installation.  If the drivers are located in  █
█  non-standard directories, you must manually copy the new drivers from the  █
█  EtherDisk diskette to these non-standard locations.                        █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

