


█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█ The EtherDisk diskette provides you with the necessary software, utilities, █
█ and documentation to use 3Com's EtherLink II family of adapters with the    █
█ most popular network operating systems (NOS's).  The diskette also includes █
█ the diagnostic program, user information, and batch files for updating      █
█ drivers.  The adapter guide that comes packaged with the adapter gives      █
█ important information on adapter installation and use and should be used in █
█ conjunction with the EtherDisk diskette.                                    █
█                                                                             █
█ Unless otherwise indicated, the term "EtherLink II adapter" refers          █
█ to the EtherLink II (3C503), the EtherLink II TP (3C503-TP), the EtherLink  █
█ II/16 (3C503-16) and the EtherLink II/16 TP (3C503-16-TP) adapters.         █
█                                                                             █
█ Before you install the network drivers make sure that:                      █
█       -  the adapter is installed in the computer                           █
█	-  the diagnostic program has been run (contained on the EtherDisk    █
█	   diskette)                                                          █
█	-  the computer is connected to the network			      █
█									      █
█ Select the Diagnostic Program and Miscellaneous Information options in      █
█ the main menu before installing the appropriate drivers.                    █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█


