


█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█                                                                             █
█                                                                             █
█    This menu provides you with the following options:                       █
█                                                                             █
█    - Select option 1 to run the diagnostic program to test your             █
█      EtherLink II, II TP, II/16, or II/16 TP adapter.                       █
█                                                                             █
█    - Select option 2 to print or display diagnostic and                     █
█      troubleshooting information files.                                     █
█                                                                             █
█    - Select option 3 to display the diagnostic program versions.            █
█                                                                             █
█    - Select option 4 to return to the EtherDisk diskette main menu.         █
█                                                                             █
█                                                                             █
█                                                                             █
█                                                                             █
█                                                                             █
█                                                                             █
█                                                                             █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

