
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█									      █
█  The EtherLink II adapter is supported by 3Com's 3+ network operating       █
█  system. The adapter can be selected when you configure your computer       █
█  during a standard 3+ NOS installation.                                     █
█									      █
█  The utility program (UPDATE.BAT) supplied on the EtherDisk diskette        █
█  automatically updates the adapter drivers in a 3+ system to the drivers'   █
█  currently released version.  Select option 1 in the 3+ main menu to run    █
█  the utility program on all servers and netstations where you have an       █
█  EtherLink II adapter running the 3+ NOS.  Also run the program on all      █
█  3+ servers where netstations startup disk(ette)s will be generated for     █
█  systems that contain the EtherLink II adapter.                             █
█									      █
█									      █
█									      █
█									      █
█									      █
█									      █
█									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

