NAME	WinBeep

DESCRIPTION 'Test of Voice Master & Windows'

STUB	'winstub.EXE'	; Previously I had a DOS version of this 
			; of this program here, so it could be
			; run DOS or windows.

CODE	MOVEABLE	  ; code can be moved in memory

;DATA must be MULTIPLE if program can be invoked more than once

DATA	MOVEABLE MULTIPLE
EXETYPE WINDOWS

HEAPSIZE  1024
STACKSIZE 4096  ; recommended minimum for Windows applications

; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
	winbeepWndProc   @1  ; name of window processing function
