                               PAGE DEFINITION

    ┌─────────────────────────┬────      If you consider your printed
    │          Header        │         sheet to be broken into 3 areas
    │           Lines        │  │       as shown to the left, all of
    ├─────────────────────────┤  │       the discussions relative to
    │                        │  │       Vertical Print Page Format will
    │                      │  │  │       make more sense.
    │         (BODY)       │  │  │
    │                      │  │ Lines    You can define the Lines per
    │        Text Lines    │  │ per      Page, the number of Header Lines
    │                      │  │ Page     and the number of Footer Lines.
    │                      │  │  │       The number of Text Lines in the
    │                      │  │  │       BODY are calculated and must be
    │                        │  │       greater than 0.  You are allowed
    ├─────────────────────────┤  │       a maximum of 15 lines in both the
    │          Footer        │  │       Header area and the Footer area.
    │           Lines        │  
    └─────────────────────────┴────             Press the PgDn Key

                          Vertical Print Page Format

    These three variables may be set in the MODIFY DEFAULTS panel by
    pressing F8 and then F2, moving the Option Selection Bar to
    the field labelled "Vertical Print Page Format" by pressing the Tab or
    Shift Tab key, and then pressing F10.

    If you modify the number of lines for the Header or Footer, you will
    be placed in the edit mode for either or both of these areas where you
    will be able to change the defaults Headers or Footers to agree with
    the new size parameter you requested.

           Body lines = Lines per Page - Header Lines - Footer Lines

    and Body lines must be greater than zero.  Once you change the
    information on this panel it will be effective immediately.  You can
    also save it to a file or make the change permanent in PC-TYPE+.

                     Press F4 to Return to the HELP Menu

