W)ho else: The "W" command tells you who is (are) logged onto the RBBS-
PC system at the current time. Some RBBS-PC systems can support several 
callers at once. If so, you will see the name and node of all callers.  

TIPS:
1. If there is only one node on the system, RBBS-PC will display your 
name.  

2. RBBS will list the last caller on each node.  The call will be
listed as "active" if the caller is still connected.
